pbar Acceleration in the MI using 2.5 MHz RF system and RF Specifications

                          Chandra Bhat, MI, 09/21/1999
                            Revised on   01/26/2000
                                 (MI Note 260)

      During Run  II we are  using  the Recycler  Ring (RR)[1] for pbar
storage  and MI for pbar  acceleration before injecting the pbars into
the Tevatron. The pbar beam from the Accumulator Ring and unused pbars
from the  Tevatron will be  transferred to the  Recycler  Ring via MI.
Then  the beam  will  be cooled.  For   details see the Recycler  Ring
design report.   Whenever  the pbar  beam is needed  for  the collider
operation the cooled pbars from the RR will be used.

 There are numbers  RF manipulations  involved before the  beam
bunches  are transferred to the Tevatron.  This writeup will summarize
the details of rf operation and also gives specifications. The entire
acceleration cycle and rf manipulations have been simulated using
longitudinal simulation code ESME [2]. The specifications have been
estabilished using the simulation results.

      The Recycler Ring RF and bunch parameters before injection of
the bunches in to the MI are as follows (from Design Report, ref. 1):

Invariant 95% longitudinal emittance = 1.5 eV-sec
Total Beam energy = 8.938 GeV
RF Voltage for 2.5 MHz system = 2 kV
Momentum Compaction factor =-0.008683
RMS bunch length = 38 nsec
RF bucket half height = 6.9 MeV
RF bucket area = 3.5 eV-sec
Ratio of bunch area to bucket area = 0.43
Number of particles = 6E10/bunch

  Four pbar bunches with above property are transferred from RR
to  the MI  with 2.5  MHz RF  buckets open. This  will  be a bucket to
bucket transfer.  After a few thousand turns  in MI, the RF voltage of
2.5 MHz  system is raised  from 2 kV to  60 kV to adiabatically shrink
the bunch  length.  This will take  about 1.25  sec.  Then the bunches
are accelerated   to 25  GeV  front  porch   in  about 4.3   sec  with
Vrf_peak(2.5MHz) = 60   kV.   After about 0.5  sec   at  25  GeV,  the
Vrf_peak(2.5MHz) is  brought down from 60kV  to 6kV in about 1.0 msec.
Bunch is  rotated for quarter synchrotron  period which  is about 0.09
sec.  Vrf_peak(2.5MHz) is increased to 60kV  in 0.001 sec and 16% h=56
component is added to linearize the RF curve in the  region of 180 deg
phase  angle.  Further the  bunch  is rotated for quarter  synchrotron
period to match with  53MHz  rf bucket  with  about 0.7 MV.  Beam   is
accelerated from this point to 150 GeV using 53MHz system. Finally the
bunches are  transferred  to the   Tevatron.  The RF  and  pbar  bunch
properties at 150 GeV are given below.

Invariant 95% longitudinal emittance ~2.2 eV-sec

Total Beam energy = 150 GeV

RF Voltage for 53 MHz system = 0.8 MV

Momentum Compaction factor =-0.008683

RMS bunch length (RMS) = 1.9 nsec

RF bucket half height = 210 MeV

RF bucket area = 5.7 eV-sec

Ratio of bunch area to bucket area = 0.38

Number of particles = 6E10/bunch

The Figure 1 show the  acceleration scheme discussed above. Some ESME
results are shown in Figure 2.

The emittance dilution  in this method  will be at  the most  50% (for
well tuned  rf  manipulations). ESME simulations indicated  that about

5-10% dilution occurs during the  transition phase jump. The remaining
dilutions occurs  during the rf manipulation at 25 GeV.

References :

[1] The Fermilab Recycler Ring Technical Design Report, Gerry Jackson,

    FERMILAB � TM- 1991 (1996).

[2] J. MacLachlan, User�s Guide to ESME 2000, March 2, 2000

Table 1: RF Voltage and Phase Requirements for the pbar Acceleration in MI.

=======================================================================
Approximate@ p
cycle time Description h=28 h=56 h=588 h=1176
 (sec)(dt)     (GeV/c)
=======================================================================
 0.05 (0.05) 8.9   hold and V=2kV   - - -
                        beam transfer  Ph=0    - - -
                  (Constant
                        voltage)

 1.3 (1.25) 8.9 shrink the V=2-60kV - - -
                    bunch Ph=0    - - -
                    (Iso-adiabatic)

 4.01 (2.71) 8.9- Accelerate V=60kV  - - -
                  ~20.4 (Constant    0<Ph<90 - - -
                     voltage)

 4.012(0.002) 20.4 Tran. Xing V=60kV - - -
                   (Constant   Ph<90 - - -
                     voltage) to ph>90

 5.6 (1.588) 25 Accelerate V=60kV - - -
                   (Constant   90<ph<180 - - -
                     voltage)

 7.1 (1.5?) 25 hold V=60kV - - -
                   voltage)   Ph=180  - - -

 7.101(0.001) 25 Match V=60-6kV - - -
                   (Linear   Ph=180  - - -
                        decrease)

 7.1876(.0866) 25  Rotate for  V=6kV - - -
                        1/4 period    Ph=180  - - -
       (Constant
                        voltage)

 7.1886(0.001) 25  (Linear V=6-60kV - - -
                        increase)    Ph=180  - - -

 7.221(.0324) 25  Rotate for  V=60kV   V=12kV - -
                        1/4 period    Ph=180    Ph=0 - -
                        (Hold the
                        voltage and
                        phase)

7.223(.002) 25  Transfer to  0kV    0kV    0.7MV -
                        h=588 sysm.  Ph=180   Ph=0   Ph=180 -

7.423 (.2) 25   -     -     V=.7-3MV-
                          -     -     Ph=180 -
=======================================================================

Table 1. continued

=======================================================================

Approximate@ p
cycle time Description h=28   h=56    h=588 h=1176

  (sec) (dt) (GeV/c)

=======================================================================

9.229(1.8) 150 Beam Accel. -     -     V=3.5 -

9.235(.006) 150 (Linear  -     -     V=3.5 -

                        decrease in     to 1.5MV

                        rf voltage)  -     -     Ph=180 -

9.4 (.171) 150 (Linear  -     -     V=1.5 -

                        decrease in     to 0.8MV

                        rf voltage)  -     -     Ph=180 -

=======================================================================

@ There may be a small difference in timings depending upon the details
of the ramp structure.

Table 2. Frequency Requirements for the 2.5 MHz system

=======================================================================

Acceleration
time (sec) cp(GeV) beta f0(Hz) f(h=28)(MHz)

=======================================================================

0.0 8.8886 0.9944 89871 2.516391

5.6 25. 0.9993  90313   2.528782

=======================================================================

                        df =       12.39 kHz

The Q value of the 2.5 MHz cavity is  ~100 (Dave Wildman and Joe Dey).

Hence, df = f0/Q = 25kHz and we need not have to tune the frequency of
the cavity during the acceleration.

      Table 3. RF Requirements for the pbar Acceleration
        =========================================

      A. 8 GeV Front porch:
        --------------------

      1. 1.5eV-sec pbar bunch transfer from RR to MI:
   h =  28
   Vrf =  2kV +/- 100V
            Phase   =  0.0
           Hold the beam for .05 sec

        2. Shrink the bunches adiabatically for 1.25 sec.
         The bunch length will be shrunk from 40ns to 18nsec
           during this time.
   h =  28
   Vrf =  2kV - 60 kV (+/- 5kV)
            Phase   =  0.0

      3. Accelerate from 8.900-25 GeV, through
         transition in about 4.3 sec. The non-adiabatic time
           is of the order of 100 msec.
   h = 28
   Vrf =  60kV +/- 5kV
         At the transition energy the acceleration phase should
           be changed from
            phase angle < 90 deg to
    phase angle > 90 in about 50 msec (??)

      B. 25 GeV Front Porch :
      ----------------------

      1. Stay for about 0.5 sec with
   h = 28
   Vrf =  60kV +/- 5kV
            Phase   = 180.0

      2. Bring down the Vrf for h=28
  h =  28
   Vrf =  60kV - 6 kV (+/- 100V)
            Phase   =  180.0
           in dt =  1 msec

      3. Bunch rotation for 1/4 synchrotron period with
           for h=28
  h =  28
   Vrf =  6 kV
            Phase   =  180.0
           in dt =  86.6 msec

      4. Raise the Vrf for h=28

       h =  28

   Vrf =  6 kV - 60 kV (+/- 5kV)

            Phase   =  180.0

           in dt =  1 msec

      5. Add 16% of h= 56 to linearize the wave form and

           rotate the bunch for 1/4 synchrotron period.

       h =  28 +56

   Vrf =  60 kV (h=28) + 12kV (h=56)

            Phase   =  180.0 (h=28) + 0 deg (h=56)

           in dt =  28.4  msec

      6. Turn on the h=588 system  and off the h=28+56  RF

         systems and hold h=588 system for  0.2 sec at 0.7 MV

       h =  588

   Vrf =  0.7 MV

            Phase   =  180.0

           in dt =  0.2 sec

      C. 25-150  GeV Acceleration :

      ----------------------------

      1. Accelerate with h=588 system

       h =  588

   Vrf =  2-4MV

          in  dt =  1.8sec.

      2. Hold the Vrf =  1.5 MV and reduce to 0.8 MV in ~.2 sec.

      3. Tevatron transfer

       h =  588

   Vrf =  0.4MV

          in  dt =  1.0 sec.

Table 4. MI Acceleration Ramp  for the above scenario:

 (the exact form of real ramp may differ from this)
=====================================================
t   p pdot
(sec)  (GeV/c) (GeV/c/sec)
=====================================================

0.0 8.9 0.0 ***    with h=28
1.3 8.9 0.0 ***    with h=28
5.6 25.0    3.77    ***    with h=28
6.351 25.0    0.0    ***    with h=28
8.151  150.0   69.44   ***    with h=588

=====================================================

Some Comments :

In the  scenario discussed we assume that  the beam is coming from the
RR  with 2.5  MHz bunch  structure  into the 2.5   MHz rf buckets. The
buckets are  fully matched. Acceleration of  the bunches in the  MI is
carriedout mainly with 2.5 MHz rf  system. ESME simulation showed that
at any given time during  rf mipulation (either at 8.9  GeV or 25 GeV)
up to about 10% 53MHz modulations is acceptable if beam has to be seen
by existing MI  BPM system. I believe  that this amount of  modulation
may not be reachable from the HLRF stand point. For example at 8.9 GeV
during beam capture our Vrf(2.5MHz) specification is about 2kV. 10% of
this on 53MHz system will be 200V. This is  a very small voltage. Also
beam loading may be an issue.  However, if we  want to modulate during
acceleration with Vrf(2.5MHz)=60 kV, that  may be o.k.  Also we do not
want  to modulate  during  transition  crossing. That  is because  the
modulation due to  53  MHz  would  introduce micro-structure  in   the
bunches  (microwave type  instability) and emittance  dilution arising
from this.  For this  purpose, during  the transition  crossing we may
even put off modulation.

Recently we  have  noticed  that  because  of   the  changes in    the
Accumulator   lattice  the beam   from  the  Accumulator  will  not be
frequency matched to RR.  This has caused an additional responsibility
on the MI before the  beam is injected into   the RR from  Accumulator
Ring and MI can not be  used as a  transferline. The beam bunches with
2.5MHz structure  from AR have to  be transferred to 2.5MHz buckets in
MI and then match the frequency to RR, cog and transfer  to RR. If the
RR is not ready before the collider commissioning  runs then we may as
well accelerate the beam to 150 GeV as outlined in the above scheme.

We also  need a tuneup procedure  with proton beam  from Booster which
has not  been included  in the above  scenario. We  may  take about  9
bunches of Booster protons capture it with 53  in MI and adiabatically
debunch  into 2.5 MHz bucket of  ~2kV. This process  will take about 3
sec.  This capture can also be done with snap coalescing which is much
faster  but  will be  having larger   emittance   growth. Then  we may
accelerate the proton beam with 2.5 MHz rf system.

      We call above scheme of beam acceleration in the MI as Scheme I.

Other viable scheme (Scheme -II) will be bunching the beam in MI with

53 MHz rf system at 8.9 GeV/c, and accelerate using the 53 MHz system.

At 150 GeV/c bunches will be coalesced before extraction from MI. We
have done simulations on both schemes. The results are summarized in
the below table.

Table 5 : Comparison Between Two Schemes of pbar Accelerations in MI. The
longitudinal emittance are 95% emittances.

--------------------------------------------------------------------------

                              Scheme I:   Scheme II:

                              Accl. with   Accl. with

                              2.5MHz and   53MHz

                              53 MZ

--------------------------------------------------------------------------

Longitudinal emittance

(e_l) in MI at 8.9 GeV 1.5 eV-s 1.5 eV-s

(95%)
e_l after Adiabatic N/A 1.6 eV-s
bunching with 53 MHz     (11 bunches with

RF system     with emittance varying from

                                  0.2 eV-s for the 3- central

                                  bunches to 0.05 eV-s for the

                                    last two bunches)
e_l at the beginning of 1.6 eV-s ~1.6 eV-s
the 25 GeV front porch

(i.e.,after the transition
crossing)
e_l at the end of RF 1.6 eV-s N/A
manipulations with 2.5 MHz
system at 25 GeV
e_l at the end of RF >2.2 eV-s N/A
capture with 53 MHz
system at 25 GeV
e_l at 150 GeV >2.2 eV-s 1.6 eV-s
e_l after coalescing N/A <3.5 eV-s
at 150 GeV
e_l at extraction >2.2 eV-s <3.5 eV-s

Cycle time ~14s(+/-3s) ~5 s

--------------------------------------------------------------------------

References :

1. The Fermilab Recycler Ring Technical Design Report, G. Jackson,

Fermilab-TM-1991 (1996)

Figure 1: Pbar acceleration ramp in the MI for Scheme �I. Various stages of RF
manipulations during the acceleration cycle is also indicated.

Figure 2: ESME simulations for the Scheme-I. Row 1: MI bunch at 8.9 GeV/c
at injection with 2.5 MHz rf structure and after shrinking. Row 2: bunch
in accelerating bucket at 8.9 GeV/c and in stationary bucket at 25 GeV/c
with 2.5 MHz rf system. Row 3: bunch captured in 53 bucket at 25 GeV/c and
at 150 GeV/c.