Beams-doc-1500-v1 January 13, 2005

Turn by Turn Measurements with the Tevatron BPM Production Electronics

Rob Kutschke, CD/EXP

Abstract Slides shown at the January 12, 2005 Tevatron BPM Upgrade Meeting.

A few additional slides plus the text will appear in the next version of this document.

Figure 1: cc

Figure 2: cc

Figure 3: cc

Figure 4: cc

Figure 5: cc

Figure 6: cc

Figure 7: cc

Figure 8: cc

Figure 9: cc

Figure 10: cc

Figure 11: cc

Figure 12: cc

Figure 13: cc