Entries 2048

(10/7 RF tick)

0 500 1000 1500 2000

(EU)

-2000

0

2000

hp114 buffer10: A

Entries 2048

(10/7 RF tick)

50 100 150 200 250

(EU)

-2000

0

2000

hp114 buffer10: A

08/29/2006 09:24

Filter Studies

Entries 2048

(kHz)

0 10000 20000 30000

(EU)

0

100

200

300

400 hp114 buffer10: Raw A Mod(FT) vs f^{Entries 2048}

(kHz)

0 1000 2000 3000

(EU)

0

100

200

300

400 Entries 2048

hp114 buffer10: Raw A Mod(FT) vs f

Entries 2048

(kHz)

0 10000 20000 30000

(EU)

0

100

200

300

hp114 buffer10: Raw B Mod(FT) vs f^{Entries 2048}

(kHz)

0 1000 2000 3000

(EU)

0

100

200

300

Entries 2048

hp114 buffer10: Raw B Mod(FT) vs f

08/29/2006 09:24

Filter Studies

Entries 2048

(10/7 RF tick)

0 500 1000 1500 2000

(EU)

-2000

0

2000

hp114 buffer10: A

Entries 2048

(10/7 RF tick)

0 500 1000 1500 2000

(EU)

-2000

0

2000

hp114 buffer10: B

08/29/2006 09:24

Filter Studies

Entries 2048

(ticks 10/7 RF)

0 500 1000 1500 2000

(mm)

-6

-4

-2

0

08/29/2006 09:24

Filter Studies

Position